p(GeV) 10 log -1 -0.5 0 0.5 1 1.5 2

Efficiency

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 a)

> 3 SIT +n VTX >1GeV; n Tp No Background With Background